% Please revise the following items when a new model is created.  

model_home:='"/auto/home48/fdc/fdc2000/model/smu1/"; 
model_name:='"Standard Model in Unitary Gauge and some vertices were droped"; 
        % The Name of the model.   
model_author:='"Jian-Xiong Wang";                  % The author of the model.  
model_time:='"Oct 13, 1994";                       % The creation date of the model.  


% The following three files must be prepared by USER and are placed 
% in directory "model_home".  

model_input:='model_input$    % description of the physical model.  
symbole_list:='symbole_list$  % something needed for drawing diagram.
physical_parameters:='physical_parameters$    % physical parameters input. 
;end;
